ACO Start-Up Kit

ACO Start-up Kit all this equipment for one great price.  Kit includes:-

Dual Release Catch Pole 4ft or 5tft or Ketch-All 4ft, 5ft or 4-6ft

Rabies Gloves

49″ Snappy Snare (non Stainless Steel); and

5′ ACO Friend and Holster.

Please use the drop down menu to select the size of gloves and pole type/length that you require.

<p>The post ACO Start-Up Kit first appeared on ACES.</p>