Rescue Tech Kit

This kit includes all the basic equipment needs that you require when rescuing animals in the field.  Kit includes:-

Humaniactm 4′ or 5′ Dual Release Pole or a Ketch-All 4′ or 5′ Catch Pole

5′ ACO Friend Cable Lead & Holster

Humaniactm Slip Leads (pack of 25)

Muzzles (color coded 7 pack)

ID Bands 20″ white

<p>The post Rescue Tech Kit first appeared on ACES.</p>